-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.26560075742
cusum  =  0.13876157873
eta  =  0.619162958298
hl_amp_ratio  =  0.490705290285
kurtosis  =  -0.655122230279
n_points  =  234
period  =  0.557171993894
period_SNR  =  24.3848022969
period_log10FAP  =  -24.0997583698
period_uncertainty  =  0.00010005483273
phase_cusum  =  0.225616335332
phase_eta  =  0.281903675752
phi21  =  0.781671504297
phi31  =  -1.24432129885
quartile31  =  0.38
r21  =  0.512477181948
r31  =  0.365698485706
shapiro_w  =  0.942451715469
skewness  =  -0.580249381959
slope_per10  =  -0.135804994032
slope_per90  =  0.229500008281
stetson_k  =  0.784514762584
weighted_mean  =  11.9473504274
weighted_std  =  0.254576548568
