-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.302258716015
cusum  =  0.117435829464
eta  =  0.564981089573
hl_amp_ratio  =  0.284386277499
kurtosis  =  -0.583675773158
n_points  =  400
period  =  0.655628892405
period_SNR  =  51.0181129751
period_log10FAP  =  -54.2410897319
period_uncertainty  =  0.000138318337887
phase_cusum  =  0.302369164051
phase_eta  =  0.13422849697
phi21  =  0.8756848056
phi31  =  1.97820754946
quartile31  =  0.3825
r21  =  0.46057758352
r31  =  0.268138336572
shapiro_w  =  0.873742461205
skewness  =  -0.840521672807
slope_per10  =  -0.17789968771
slope_per90  =  0.217916149911
stetson_k  =  0.705606935408
weighted_mean  =  14.0781010088
weighted_std  =  0.252536810449
