<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.52


######### Lightcurve features #########

amplitude  =  0.253234220985
cusum  =  0.137920919487
eta  =  1.47604395936
hl_amp_ratio  =  1.13931872819
kurtosis  =  0.195071415485
n_points  =  331
period  =  0.636919960446
period_SNR  =  31.6354357886
period_log10FAP  =  -19.7480123185
period_uncertainty  =  0.000112474390675
phase_cusum  =  0.255028757456
phase_eta  =  1.24352923511
phi21  =  -2.28145631981
phi31  =  -4.11747816221
quartile31  =  0.4
r21  =  0.35374215395
r31  =  0.329491972589
shapiro_w  =  0.989533901215
skewness  =  0.352303093267
slope_per10  =  -0.0454378905223
slope_per90  =  0.0381633656192
stetson_k  =  0.816908108198
weighted_mean  =  18.9550145444
weighted_std  =  0.297325330137
</pre></body></html>