-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.76


######### Lightcurve features #########

amplitude  =  0.280601362624
cusum  =  0.18859550943
eta  =  1.05883344386
hl_amp_ratio  =  1.26191236468
kurtosis  =  -0.378663674167
n_points  =  306
period  =  0.645446759717
period_SNR  =  30.0677749888
period_log10FAP  =  -20.0833471304
period_uncertainty  =  0.000115489332156
phase_cusum  =  0.300656350673
phase_eta  =  0.88844160855
phi21  =  -1.9651944123
phi31  =  -0.0457432284385
quartile31  =  0.515
r21  =  0.490936480192
r31  =  0.196716385023
shapiro_w  =  0.982804536819
skewness  =  0.367529903335
slope_per10  =  -0.0471858920728
slope_per90  =  0.0360250627843
stetson_k  =  0.808766702768
weighted_mean  =  19.2929629987
weighted_std  =  0.334698935288
