-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.200203896758
cusum  =  0.12479973237
eta  =  0.585410685733
hl_amp_ratio  =  0.743611718569
kurtosis  =  -1.06909605911
n_points  =  318
period  =  0.703793651353
period_SNR  =  48.6612258956
period_log10FAP  =  -42.3857238101
period_uncertainty  =  0.000140815061705
phase_cusum  =  0.251579841309
phase_eta  =  0.137056183718
phi21  =  -1.97187149366
phi31  =  -3.45200176537
quartile31  =  0.28
r21  =  0.53838412338
r31  =  0.303179139389
shapiro_w  =  0.962864279747
skewness  =  -0.138830938527
slope_per10  =  -0.266876068125
slope_per90  =  0.286345316679
stetson_k  =  0.843950664339
weighted_mean  =  14.9405012879
weighted_std  =  0.172385602867
