-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.297077606362
cusum  =  0.158672561752
eta  =  0.561719428791
hl_amp_ratio  =  0.408840558765
kurtosis  =  -0.394890950684
n_points  =  318
period  =  0.556320250538
period_SNR  =  37.1438729337
period_log10FAP  =  -30.1565570994
period_uncertainty  =  0.000140751493296
phase_cusum  =  0.237354430653
phase_eta  =  0.75819728076
phi21  =  3.75037393748
phi31  =  2.67018579056
quartile31  =  0.4075
r21  =  0.356922023738
r31  =  0.0386798107889
shapiro_w  =  0.917787134647
skewness  =  -0.778287869569
slope_per10  =  -0.0656706947793
slope_per90  =  0.0755785352534
stetson_k  =  0.72086900431
weighted_mean  =  16.1949822931
weighted_std  =  0.306867771016
