-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.231060890534
cusum  =  0.31790110079
eta  =  0.411266675569
hl_amp_ratio  =  0.978558746991
kurtosis  =  -0.485930906508
n_points  =  406
period  =  0.692644341347
period_SNR  =  28.827942953
period_log10FAP  =  -28.363468105
period_uncertainty  =  0.000133016662673
phase_cusum  =  0.2524855471
phase_eta  =  0.942450997353
phi21  =  -1.4106570933
phi31  =  0.0747720193306
quartile31  =  0.41
r21  =  0.380457222276
r31  =  0.149313667375
shapiro_w  =  0.979838967323
skewness  =  -0.189361341353
slope_per10  =  -0.0785909344593
slope_per90  =  0.0959858617384
stetson_k  =  0.804659547308
weighted_mean  =  16.9710465838
weighted_std  =  0.258952326834
