-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.129499415346
cusum  =  0.0911442935587
eta  =  0.84147747965
hl_amp_ratio  =  0.966171671053
kurtosis  =  -0.660469025457
n_points  =  360
period  =  0.62813546949
period_SNR  =  39.2691583491
period_log10FAP  =  -36.5265497498
period_uncertainty  =  0.000109377914567
phase_cusum  =  0.215192235103
phase_eta  =  0.750790531503
phi21  =  -1.90958450623
phi31  =  -3.29001755847
quartile31  =  0.1925
r21  =  0.344435876954
r31  =  0.188079700394
shapiro_w  =  0.99006742239
skewness  =  -0.0564385145855
slope_per10  =  -0.100099043856
slope_per90  =  0.0939145861307
stetson_k  =  0.818454010252
weighted_mean  =  16.9024254891
weighted_std  =  0.131864216801
