-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.166507492192
cusum  =  0.0961024768988
eta  =  0.743457123757
hl_amp_ratio  =  0.733580228433
kurtosis  =  -0.762351089252
n_points  =  361
period  =  0.654343864741
period_SNR  =  46.9782527366
period_log10FAP  =  -47.8068257738
period_uncertainty  =  0.000118712606207
phase_cusum  =  0.218251350265
phase_eta  =  0.386090193097
phi21  =  -2.17889829173
phi31  =  -4.17689146634
quartile31  =  0.21
r21  =  0.332257173607
r31  =  0.225675015952
shapiro_w  =  0.965417385101
skewness  =  -0.399394753442
slope_per10  =  -0.163139580371
slope_per90  =  0.120748119588
stetson_k  =  0.808621844594
weighted_mean  =  16.8043588696
weighted_std  =  0.128822139655
