<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.351833917556
cusum  =  0.117744402292
eta  =  0.478528981259
hl_amp_ratio  =  0.533313292238
kurtosis  =  -1.1629770552
n_points  =  361
period  =  0.473509388784
period_SNR  =  41.7817650307
period_log10FAP  =  -47.9462160111
period_uncertainty  =  6.2156654846e-05
phase_cusum  =  0.236579308826
phase_eta  =  0.0909085079327
phi21  =  3.94920118513
phi31  =  5.11167475803
quartile31  =  0.59
r21  =  0.478868540815
r31  =  0.346164315691
shapiro_w  =  0.91000854969
skewness  =  -0.466660144685
slope_per10  =  -0.084446555832
slope_per90  =  0.148316566203
stetson_k  =  0.830591849345
weighted_mean  =  14.8307293473
weighted_std  =  0.324200052461
</pre></body></html>