-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.342637885333
cusum  =  0.181649668904
eta  =  0.681129566543
hl_amp_ratio  =  0.641999125435
kurtosis  =  -1.05039441589
n_points  =  303
period  =  0.49065834273
period_SNR  =  45.0132454001
period_log10FAP  =  -36.6733615528
period_uncertainty  =  0.000164328796349
phase_cusum  =  0.229446474818
phase_eta  =  0.364684822124
phi21  =  -2.47223209316
phi31  =  -4.72538801448
quartile31  =  0.54
r21  =  0.407393441781
r31  =  0.267973741585
shapiro_w  =  0.9120875597
skewness  =  -0.4794949586
slope_per10  =  -0.0757992749129
slope_per90  =  0.160257825885
stetson_k  =  0.829737198401
weighted_mean  =  14.4740080219
weighted_std  =  0.308409067105
