-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.296323930203
cusum  =  0.126850326149
eta  =  0.64249875075
hl_amp_ratio  =  0.334513542132
kurtosis  =  -0.997433997244
n_points  =  318
period  =  0.611190510878
period_SNR  =  48.1127620472
period_log10FAP  =  -42.6114419431
period_uncertainty  =  0.000106212729146
phase_cusum  =  0.297585012647
phase_eta  =  0.240422887456
phi21  =  0.777727758646
phi31  =  1.93712448525
quartile31  =  0.43
r21  =  0.430629844428
r31  =  0.299221641502
shapiro_w  =  0.899212539196
skewness  =  -0.595241406156
slope_per10  =  -0.111023974857
slope_per90  =  0.171421744731
stetson_k  =  0.742440075196
weighted_mean  =  15.9320138992
weighted_std  =  0.279007564885
