-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.8


######### Lightcurve features #########

amplitude  =  0.142477153805
cusum  =  0.0850443380575
eta  =  1.7396651832
hl_amp_ratio  =  0.866945129086
kurtosis  =  0.0222438056619
n_points  =  380
period  =  0.64401776032
period_SNR  =  29.3332826502
period_log10FAP  =  -12.5189689272
period_uncertainty  =  0.00011499496108
phase_cusum  =  0.176403386008
phase_eta  =  1.59903653579
phi21  =  0.815654178009
phi31  =  2.36299213434
quartile31  =  0.2925
r21  =  0.125625398477
r31  =  0.110487564179
shapiro_w  =  0.99167484045
skewness  =  -0.167654911713
slope_per10  =  -0.0708031330466
slope_per90  =  0.0427796344327
stetson_k  =  0.805075905624
weighted_mean  =  18.8303726684
weighted_std  =  0.205029319054
