-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.326865778381
cusum  =  0.12828411376
eta  =  0.771640816467
hl_amp_ratio  =  0.379612420155
kurtosis  =  -1.20637272359
n_points  =  309
period  =  0.614953875052
period_SNR  =  52.2958899869
period_log10FAP  =  -47.5362207008
period_uncertainty  =  0.000172063212141
phase_cusum  =  0.246780414943
phase_eta  =  0.208519852265
phi21  =  0.846952903159
phi31  =  1.97466954767
quartile31  =  0.55
r21  =  0.314989505289
r31  =  0.142236747138
shapiro_w  =  0.915237605572
skewness  =  -0.295456702112
slope_per10  =  -0.107829242043
slope_per90  =  0.160231376662
stetson_k  =  0.802584654952
weighted_mean  =  15.4470396353
weighted_std  =  0.301228323546
