-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.339918430618
cusum  =  0.183254397174
eta  =  0.452050431512
hl_amp_ratio  =  0.705651577569
kurtosis  =  -1.00121587964
n_points  =  351
period  =  0.683528585613
period_SNR  =  40.3421766377
period_log10FAP  =  -45.4258338938
period_uncertainty  =  0.000125694852483
phase_cusum  =  0.25821723757
phase_eta  =  0.0351098055185
phi21  =  4.29614079486
phi31  =  5.60761994692
quartile31  =  0.46
r21  =  0.496603492221
r31  =  0.361218675258
shapiro_w  =  0.927732050419
skewness  =  -0.454670176983
slope_per10  =  -0.173147924676
slope_per90  =  0.386072721504
stetson_k  =  0.841296656761
weighted_mean  =  14.2374604038
weighted_std  =  0.292534474916
