-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.188960381308
cusum  =  0.140389486452
eta  =  0.573388543281
hl_amp_ratio  =  1.16108473509
kurtosis  =  -1.29858860422
n_points  =  169
period  =  0.62765639992
period_SNR  =  24.5798001619
period_log10FAP  =  -25.2008909526
period_uncertainty  =  0.000126094507182
phase_cusum  =  0.305843514879
phase_eta  =  0.0668812141326
phi21  =  4.3220114136
phi31  =  5.53624444689
quartile31  =  0.27
r21  =  0.409371830071
r31  =  0.174324713212
shapiro_w  =  0.944721639156
skewness  =  0.0726336597825
slope_per10  =  -0.351899988018
slope_per90  =  0.544400024228
stetson_k  =  0.892589233417
weighted_mean  =  15.6464935345
weighted_std  =  0.145203075545
