-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.69


######### Lightcurve features #########

amplitude  =  0.0179985214248
cusum  =  0.176648606686
eta  =  1.52196913802
hl_amp_ratio  =  1.62266676937
kurtosis  =  4.72959466268
n_points  =  169
period  =  2.70577165704
period_SNR  =  11.4517651164
period_log10FAP  =  -1.75858497702
period_uncertainty  =  0.00195221717866
phase_cusum  =  0.145364211475
phase_eta  =  1.52592744527
phi21  =  1.14594041277
phi31  =  -1.60037192374
quartile31  =  0.03
r21  =  0.266777017209
r31  =  0.284798089178
shapiro_w  =  0.928352355957
skewness  =  1.07905413054
slope_per10  =  -0.731999985874
slope_per90  =  1.27820196602
stetson_k  =  0.740694091963
weighted_mean  =  15.5947095525
weighted_std  =  0.024525654382
