-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.234182821039
cusum  =  0.102093970147
eta  =  0.534382047117
hl_amp_ratio  =  0.643384582189
kurtosis  =  -1.06764671413
n_points  =  391
period  =  0.571199716856
period_SNR  =  50.021284697
period_log10FAP  =  -56.394051311
period_uncertainty  =  0.000108544955498
phase_cusum  =  0.224078039745
phase_eta  =  0.269869613053
phi21  =  -2.2529324128
phi31  =  -1.02036857496
quartile31  =  0.335
r21  =  0.407215010287
r31  =  0.2178608811
shapiro_w  =  0.945031344891
skewness  =  -0.350456478547
slope_per10  =  -0.11318619445
slope_per90  =  0.206978155485
stetson_k  =  0.836412530734
weighted_mean  =  15.024441821
weighted_std  =  0.192969831017
