-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.168776526418
cusum  =  0.152171906702
eta  =  0.607758003339
hl_amp_ratio  =  0.704818544353
kurtosis  =  -1.13022485448
n_points  =  318
period  =  0.723898730551
period_SNR  =  49.4069782815
period_log10FAP  =  -44.4947808682
period_uncertainty  =  0.000148999415443
phase_cusum  =  0.251861732679
phase_eta  =  0.0786299814909
phi21  =  1.21282580219
phi31  =  2.66238689888
quartile31  =  0.23
r21  =  0.43648293035
r31  =  0.254351442753
shapiro_w  =  0.953989624977
skewness  =  -0.218320341882
slope_per10  =  -0.345239959863
slope_per90  =  0.460197955172
stetson_k  =  0.858439400776
weighted_mean  =  13.92284113
weighted_std  =  0.139879045448
