-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.155070212444
cusum  =  0.12637255968
eta  =  0.631656718726
hl_amp_ratio  =  0.750708560667
kurtosis  =  -0.802476975656
n_points  =  354
period  =  0.730104976925
period_SNR  =  40.1246284511
period_log10FAP  =  -46.8544242952
period_uncertainty  =  0.000147794535555
phase_cusum  =  0.213580766923
phase_eta  =  0.340146875307
phi21  =  -2.04664155002
phi31  =  -3.84566299148
quartile31  =  0.2
r21  =  0.392864826673
r31  =  0.237644213253
shapiro_w  =  0.97424608469
skewness  =  -0.259114001681
slope_per10  =  -0.182834413476
slope_per90  =  0.222261793668
stetson_k  =  0.816357266021
weighted_mean  =  15.8074619995
weighted_std  =  0.138007596271
