-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.336907001154
cusum  =  0.100483284028
eta  =  0.560346906582
hl_amp_ratio  =  0.612264576758
kurtosis  =  -1.03896512145
n_points  =  390
period  =  0.613896788753
period_SNR  =  44.5889561012
period_log10FAP  =  -47.3794597819
period_uncertainty  =  0.00012537888509
phase_cusum  =  0.221552022322
phase_eta  =  0.266909331329
phi21  =  -2.24095992428
phi31  =  -4.06532022781
quartile31  =  0.51
r21  =  0.457574632648
r31  =  0.34640745617
shapiro_w  =  0.940400660038
skewness  =  -0.386696087539
slope_per10  =  -0.141933111888
slope_per90  =  0.142505495665
stetson_k  =  0.820657251305
weighted_mean  =  16.3079654583
weighted_std  =  0.301425331763
