-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.74


######### Lightcurve features #########

amplitude  =  0.167874705048
cusum  =  0.132676185933
eta  =  0.520873792561
hl_amp_ratio  =  0.615385369493
kurtosis  =  -0.75896067512
n_points  =  106
period  =  0.189439338234
period_SNR  =  11.0338974921
period_log10FAP  =  -7.66465794367
period_uncertainty  =  7.69343669854e-06
phase_cusum  =  0.278174645422
phase_eta  =  0.70710557665
phi21  =  3.66635695978
phi31  =  4.77926932722
quartile31  =  0.24
r21  =  0.34569471826
r31  =  0.229671768076
shapiro_w  =  0.942988455296
skewness  =  -0.514724251613
slope_per10  =  -0.124800004375
slope_per90  =  0.139670087243
stetson_k  =  0.822437559004
weighted_mean  =  12.883490566
weighted_std  =  0.155478824942
