-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.199182118918
cusum  =  0.110492133246
eta  =  0.521168397815
hl_amp_ratio  =  0.570672186021
kurtosis  =  -0.990595564785
n_points  =  383
period  =  0.610612806744
period_SNR  =  53.4116718488
period_log10FAP  =  -62.3910054878
period_uncertainty  =  0.000124041068244
phase_cusum  =  0.240343613684
phase_eta  =  0.0402868931492
phi21  =  0.922471908563
phi31  =  2.18276686926
quartile31  =  0.24
r21  =  0.396113321868
r31  =  0.22679725082
shapiro_w  =  0.922901749611
skewness  =  -0.504388985637
slope_per10  =  -0.253473935426
slope_per90  =  0.26393227747
stetson_k  =  0.832523197352
weighted_mean  =  14.9073405883
weighted_std  =  0.154320428197
