-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.251942832279
cusum  =  0.112627541883
eta  =  0.787049375658
hl_amp_ratio  =  0.502865738455
kurtosis  =  -0.530579578561
n_points  =  258
period  =  0.576334987957
period_SNR  =  20.4500503545
period_log10FAP  =  -16.6639540134
period_uncertainty  =  0.000187645711813
phase_cusum  =  0.229483879164
phase_eta  =  0.856363418883
phi21  =  3.57608433315
phi31  =  4.89737963002
quartile31  =  0.4475
r21  =  0.478422961351
r31  =  0.318415425723
shapiro_w  =  0.946671426296
skewness  =  -0.490285556391
slope_per10  =  -0.136438336971
slope_per90  =  0.125386662471
stetson_k  =  0.790002592506
weighted_mean  =  11.7054263566
weighted_std  =  0.304740346336
