-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.345374364401
cusum  =  0.177093496623
eta  =  0.515746169072
hl_amp_ratio  =  0.326031060772
kurtosis  =  -0.803082443945
n_points  =  339
period  =  0.647067853964
period_SNR  =  39.0335577562
period_log10FAP  =  -41.6519481827
period_uncertainty  =  0.000109073540492
phase_cusum  =  0.248310085479
phase_eta  =  0.122313998143
phi21  =  -2.31959031066
phi31  =  -1.2682541334
quartile31  =  0.465
r21  =  0.541633994915
r31  =  0.256906338465
shapiro_w  =  0.884380877018
skewness  =  -0.737531724417
slope_per10  =  -0.155297740633
slope_per90  =  0.240933330109
stetson_k  =  0.74784977065
weighted_mean  =  12.9354374691
weighted_std  =  0.291631329503
