-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.48


######### Lightcurve features #########

amplitude  =  0.327894410923
cusum  =  0.205198433612
eta  =  1.70665501648
hl_amp_ratio  =  1.07976384575
kurtosis  =  -0.295692685852
n_points  =  227
period  =  0.257413122143
period_SNR  =  24.7958370944
period_log10FAP  =  -9.29118572214
period_uncertainty  =  2.21990793162e-05
phase_cusum  =  0.270753146352
phase_eta  =  1.50561578387
phi21  =  0.835967532092
phi31  =  -1.25494749949
quartile31  =  0.57
r21  =  0.246644500837
r31  =  0.303986896513
shapiro_w  =  0.992896974087
skewness  =  0.17690641857
slope_per10  =  -0.0178557925777
slope_per90  =  0.0134136192194
stetson_k  =  0.798313708475
weighted_mean  =  18.9058254681
weighted_std  =  0.401335436976
