-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.59


######### Lightcurve features #########

amplitude  =  0.289715072066
cusum  =  0.0989860749638
eta  =  0.540769027754
hl_amp_ratio  =  0.607382316765
kurtosis  =  -1.04126625839
n_points  =  373
period  =  0.560132109502
period_SNR  =  44.0024075908
period_log10FAP  =  -47.3298150814
period_uncertainty  =  0.00011783041641
phase_cusum  =  0.253380615655
phase_eta  =  0.489485083984
phi21  =  -2.28489796203
phi31  =  -3.17657774006
quartile31  =  0.45
r21  =  0.205874025952
r31  =  0.141061602604
shapiro_w  =  0.947113990784
skewness  =  -0.343494196848
slope_per10  =  -0.0809951266228
slope_per90  =  0.0545443262866
stetson_k  =  0.85186368191
weighted_mean  =  12.5811190689
weighted_std  =  0.272410246015
