-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.133851582251
cusum  =  0.107854703749
eta  =  1.1516077111
hl_amp_ratio  =  0.920669026642
kurtosis  =  0.2097823737
n_points  =  262
period  =  0.646543702527
period_SNR  =  30.4984162055
period_log10FAP  =  -17.2787952129
period_uncertainty  =  0.000116713070032
phase_cusum  =  0.19688951769
phase_eta  =  1.17107986572
phi21  =  1.26188711073
phi31  =  3.23319556817
quartile31  =  0.2
r21  =  0.338935394642
r31  =  0.155739811744
shapiro_w  =  0.992673397064
skewness  =  -0.198780838572
slope_per10  =  -0.110464680819
slope_per90  =  0.118714038172
stetson_k  =  0.778255661061
weighted_mean  =  17.9255563615
weighted_std  =  0.151143283052
