-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.325710763004
cusum  =  0.0853910710221
eta  =  0.926406404112
hl_amp_ratio  =  0.50675515467
kurtosis  =  -0.841351261431
n_points  =  351
period  =  0.652877220938
period_SNR  =  34.1953836139
period_log10FAP  =  -27.306661551
period_uncertainty  =  0.000137245585409
phase_cusum  =  0.211363997768
phase_eta  =  0.794214777606
phi21  =  -2.30496827613
phi31  =  -0.585441607446
quartile31  =  0.565
r21  =  0.445211064634
r31  =  0.212355621826
shapiro_w  =  0.936936795712
skewness  =  -0.52472871855
slope_per10  =  -0.0948599986732
slope_per90  =  0.155642933928
stetson_k  =  0.791165224931
weighted_mean  =  15.9457781428
weighted_std  =  0.335669616679
