-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.0728115944328
cusum  =  0.0817666557519
eta  =  1.76623008594
hl_amp_ratio  =  1.14208688597
kurtosis  =  -0.0824170714228
n_points  =  227
period  =  0.260052758449
period_SNR  =  19.8874549913
period_log10FAP  =  -7.06795223153
period_uncertainty  =  1.4430539884e-05
phase_cusum  =  0.156206870902
phase_eta  =  1.6062757
phi21  =  -0.642794246692
phi31  =  -3.24209614768
quartile31  =  0.125
r21  =  0.143657429964
r31  =  0.309580740206
shapiro_w  =  0.993997812271
skewness  =  0.179698840049
slope_per10  =  -0.0860886098245
slope_per90  =  0.0553263597613
stetson_k  =  0.797444500235
weighted_mean  =  17.3333261681
weighted_std  =  0.0952397863092
