-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.318056302537
cusum  =  0.125294833935
eta  =  0.695003085131
hl_amp_ratio  =  0.350788239783
kurtosis  =  -0.32850378106
n_points  =  281
period  =  0.596041376693
period_SNR  =  44.0675382786
period_log10FAP  =  -34.8796236423
period_uncertainty  =  0.000122289988056
phase_cusum  =  0.23961775906
phase_eta  =  0.302683044548
phi21  =  1.00023911908
phi31  =  1.87152024071
quartile31  =  0.42
r21  =  0.441912333159
r31  =  0.242166712788
shapiro_w  =  0.883162260056
skewness  =  -0.904497683547
slope_per10  =  -0.0766069138033
slope_per90  =  0.148753335069
stetson_k  =  0.719936265665
weighted_mean  =  14.3636043795
weighted_std  =  0.285096851497
