-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.62


######### Lightcurve features #########

amplitude  =  0.149095744989
cusum  =  0.188858513818
eta  =  0.535322053595
hl_amp_ratio  =  0.576448702892
kurtosis  =  -1.39165503175
n_points  =  238
period  =  0.177084081281
period_SNR  =  17.4674306183
period_log10FAP  =  -15.674974608
period_uncertainty  =  1.37287785312e-05
phase_cusum  =  0.243785219215
phase_eta  =  1.04584540575
phi21  =  -0.301592126669
phi31  =  -3.3108568104
quartile31  =  0.33
r21  =  0.351807305495
r31  =  0.154714259095
shapiro_w  =  0.908751726151
skewness  =  -0.14814330825
slope_per10  =  -0.050758538581
slope_per90  =  0.0283806867677
stetson_k  =  0.860032301911
weighted_mean  =  16.12328037
weighted_std  =  0.172999272465
