-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.341339373438
cusum  =  0.127946426491
eta  =  0.5914201145
hl_amp_ratio  =  0.602966009324
kurtosis  =  -0.945615022319
n_points  =  341
period  =  0.625956307788
period_SNR  =  34.1697146085
period_log10FAP  =  -35.8349569126
period_uncertainty  =  0.000108620171771
phase_cusum  =  0.252373348926
phase_eta  =  0.0892902280636
phi21  =  4.16098539748
phi31  =  5.41142982458
quartile31  =  0.48
r21  =  0.590636023609
r31  =  0.372383614146
shapiro_w  =  0.944641590118
skewness  =  -0.425287050313
slope_per10  =  -0.122581078036
slope_per90  =  0.243549991865
stetson_k  =  0.824736734577
weighted_mean  =  12.9684218289
weighted_std  =  0.307360567129
