-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.288169031757
cusum  =  0.158049383792
eta  =  0.670591234134
hl_amp_ratio  =  0.479448462876
kurtosis  =  -0.665430953628
n_points  =  306
period  =  0.571407717584
period_SNR  =  46.776472977
period_log10FAP  =  -38.9618104816
period_uncertainty  =  0.000149926600055
phase_cusum  =  0.260143441393
phase_eta  =  0.375357981187
phi21  =  3.83899331594
phi31  =  4.65047371631
quartile31  =  0.42
r21  =  0.350218476239
r31  =  0.14784827441
shapiro_w  =  0.932139515877
skewness  =  -0.600002138419
slope_per10  =  -0.1017339959
slope_per90  =  0.14180623197
stetson_k  =  0.789970884227
weighted_mean  =  14.2988615957
weighted_std  =  0.253165352757
