-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.278582073721
cusum  =  0.140083267205
eta  =  0.507401619091
hl_amp_ratio  =  0.479105386729
kurtosis  =  -0.360366468924
n_points  =  364
period  =  0.593679607493
period_SNR  =  41.3328793027
period_log10FAP  =  -45.0687031507
period_uncertainty  =  0.000113485337553
phase_cusum  =  0.226095424693
phase_eta  =  0.073361230031
phi21  =  -2.17460849038
phi31  =  -0.99079992268
quartile31  =  0.29
r21  =  0.520313177889
r31  =  0.324008388831
shapiro_w  =  0.910867273808
skewness  =  -0.791169186587
slope_per10  =  -0.225010729186
slope_per90  =  0.304999994114
stetson_k  =  0.762155312084
weighted_mean  =  13.7994317195
weighted_std  =  0.23640607151
