-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.194988343367
cusum  =  0.191933782134
eta  =  0.623153830968
hl_amp_ratio  =  0.841512252767
kurtosis  =  -0.764655137789
n_points  =  310
period  =  0.604137605575
period_SNR  =  50.4683850528
period_log10FAP  =  -39.8547486155
period_uncertainty  =  0.000104739532421
phase_cusum  =  0.226088040667
phase_eta  =  0.447682269642
phi21  =  1.18674267004
phi31  =  -0.468585241775
quartile31  =  0.2775
r21  =  0.379400170656
r31  =  0.105998014842
shapiro_w  =  0.973318517208
skewness  =  -0.266171400901
slope_per10  =  -0.127948053262
slope_per90  =  0.174954687178
stetson_k  =  0.822779003865
weighted_mean  =  14.7548292275
weighted_std  =  0.168459057663
