-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.169960830583
cusum  =  0.121200339002
eta  =  0.648298617118
hl_amp_ratio  =  0.721304672551
kurtosis  =  -0.63122241139
n_points  =  341
period  =  0.805935607493
period_SNR  =  39.5699242626
period_log10FAP  =  -42.2918277787
period_uncertainty  =  0.000174747537698
phase_cusum  =  0.21565903467
phase_eta  =  0.268764619258
phi21  =  -1.68260652452
phi31  =  -0.123253999993
quartile31  =  0.22
r21  =  0.473667084306
r31  =  0.256412700367
shapiro_w  =  0.978242695332
skewness  =  -0.237519939683
slope_per10  =  -0.228841050951
slope_per90  =  0.25721080564
stetson_k  =  0.824125760288
weighted_mean  =  13.0591703486
weighted_std  =  0.145900447376
