-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.332177154314
cusum  =  0.13543126923
eta  =  0.505382929199
hl_amp_ratio  =  0.524012285245
kurtosis  =  -0.874786343507
n_points  =  374
period  =  0.652978787613
period_SNR  =  44.2963955416
period_log10FAP  =  -49.0967489691
period_uncertainty  =  0.000119505638472
phase_cusum  =  0.211827213672
phase_eta  =  0.0440605091654
phi21  =  1.15074823932
phi31  =  2.37311296647
quartile31  =  0.41
r21  =  0.530290309821
r31  =  0.355139130073
shapiro_w  =  0.924852728844
skewness  =  -0.550194389076
slope_per10  =  -0.18820762007
slope_per90  =  0.385106069064
stetson_k  =  0.798700471299
weighted_mean  =  13.9097490688
weighted_std  =  0.280567664736
