-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.199712995629
cusum  =  0.132725064307
eta  =  1.22968686209
hl_amp_ratio  =  1.00902846728
kurtosis  =  -0.287607277391
n_points  =  275
period  =  0.692175486122
period_SNR  =  26.9566510551
period_log10FAP  =  -16.1308911484
period_uncertainty  =  0.000134152940361
phase_cusum  =  0.252255777228
phase_eta  =  1.04511973745
phi21  =  -2.15375211335
phi31  =  -3.76643203347
quartile31  =  0.34
r21  =  0.337214127933
r31  =  0.255434402525
shapiro_w  =  0.996685504913
skewness  =  0.0530281298034
slope_per10  =  -0.0668772476754
slope_per90  =  0.0601954783599
stetson_k  =  0.807434515018
weighted_mean  =  18.8396376328
weighted_std  =  0.236597313807
