-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.30857969397
cusum  =  0.0998660071765
eta  =  0.47274200713
hl_amp_ratio  =  0.425086614833
kurtosis  =  -0.62093471577
n_points  =  313
period  =  0.550007276752
period_SNR  =  46.8911355603
period_log10FAP  =  -42.9447281499
period_uncertainty  =  0.000137210255417
phase_cusum  =  0.216694288776
phase_eta  =  0.188109165021
phi21  =  0.736993229168
phi31  =  -1.38423416192
quartile31  =  0.35
r21  =  0.405831985351
r31  =  0.269223552184
shapiro_w  =  0.914178907871
skewness  =  -0.719803984803
slope_per10  =  -0.120418721785
slope_per90  =  0.157644798191
stetson_k  =  0.74772441589
weighted_mean  =  15.5218215507
weighted_std  =  0.253743355392
