-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.219765141265
cusum  =  0.105541258768
eta  =  1.39545942605
hl_amp_ratio  =  0.912403459007
kurtosis  =  -0.0101857816957
n_points  =  290
period  =  0.555222611607
period_SNR  =  16.633505523
period_log10FAP  =  -7.6836523795
period_uncertainty  =  0.000103278019125
phase_cusum  =  0.163979562835
phase_eta  =  1.6685697192
phi21  =  -2.27935335311
phi31  =  -1.11036864366
quartile31  =  0.45
r21  =  0.359576999666
r31  =  0.286600553503
shapiro_w  =  0.994628667831
skewness  =  0.116961932758
slope_per10  =  -0.0413890522406
slope_per90  =  0.0341254488238
stetson_k  =  0.785753385099
weighted_mean  =  19.2107814866
weighted_std  =  0.319369524429
