-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.284763861964
cusum  =  0.0953026830408
eta  =  0.685162197222
hl_amp_ratio  =  0.415634474851
kurtosis  =  -0.274596253209
n_points  =  301
period  =  0.65631499965
period_SNR  =  38.296673217
period_log10FAP  =  -41.4168637512
period_uncertainty  =  0.000137871653654
phase_cusum  =  0.241749451305
phase_eta  =  0.124726510392
phi21  =  0.945088092841
phi31  =  1.98961944315
quartile31  =  0.36
r21  =  0.459871049252
r31  =  0.298001858558
shapiro_w  =  0.914286136627
skewness  =  -0.812771007741
slope_per10  =  -0.146466177632
slope_per90  =  0.273399993312
stetson_k  =  0.757221800925
weighted_mean  =  15.8305473063
weighted_std  =  0.247749120794
