-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.362020135095
cusum  =  0.18559635719
eta  =  0.860290169874
hl_amp_ratio  =  1.19515025096
kurtosis  =  -0.733816485231
n_points  =  141
period  =  0.573858721051
period_SNR  =  18.4906537245
period_log10FAP  =  -9.6269185185
period_uncertainty  =  0.000127789210846
phase_cusum  =  0.330019310292
phase_eta  =  0.477638736044
phi21  =  -1.63698654629
phi31  =  -3.53851249488
quartile31  =  0.6
r21  =  0.57471612251
r31  =  0.343117006088
shapiro_w  =  0.952026963234
skewness  =  0.136560045219
slope_per10  =  -0.0956542299047
slope_per90  =  0.387299969617
stetson_k  =  0.765129117091
weighted_mean  =  14.1531050263
weighted_std  =  0.349458990499
