-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.284496413775
cusum  =  0.102140151613
eta  =  0.616590650276
hl_amp_ratio  =  0.469070904803
kurtosis  =  -0.871960801751
n_points  =  325
period  =  0.625083822821
period_SNR  =  49.6229784862
period_log10FAP  =  -42.0837520598
period_uncertainty  =  0.000132902307104
phase_cusum  =  0.263023295477
phase_eta  =  0.289121986643
phi21  =  -2.19476981563
phi31  =  -3.92551036776
quartile31  =  0.44
r21  =  0.433538766178
r31  =  0.290363914575
shapiro_w  =  0.935673236847
skewness  =  -0.350619391688
slope_per10  =  -0.146560206344
slope_per90  =  0.197358037531
stetson_k  =  0.814947637176
weighted_mean  =  14.626226397
weighted_std  =  0.261037414566
