-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.260635258312
cusum  =  0.152928201646
eta  =  0.510015465477
hl_amp_ratio  =  0.700317310367
kurtosis  =  -0.531614163738
n_points  =  417
period  =  0.636110435994
period_SNR  =  50.4652709432
period_log10FAP  =  -55.1481629611
period_uncertainty  =  0.000105539960978
phase_cusum  =  0.2594020758
phase_eta  =  0.322732021297
phi21  =  -2.0976219374
phi31  =  -0.969402330826
quartile31  =  0.32
r21  =  0.455695628709
r31  =  0.274684202526
shapiro_w  =  0.963779091835
skewness  =  -0.499809935109
slope_per10  =  -0.122394982073
slope_per90  =  0.0690403423391
stetson_k  =  0.802917349272
weighted_mean  =  16.8245689589
weighted_std  =  0.222487665634
