-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.343253808143
cusum  =  0.193532202693
eta  =  0.610708140164
hl_amp_ratio  =  0.587461815911
kurtosis  =  -0.430195504417
n_points  =  161
period  =  0.649775146243
period_SNR  =  22.8659030016
period_log10FAP  =  -18.134407898
period_uncertainty  =  0.000218411837002
phase_cusum  =  0.255186297823
phase_eta  =  0.221874755823
phi21  =  1.03915647233
phi31  =  2.13416512636
quartile31  =  0.35
r21  =  0.530505733592
r31  =  0.335629857145
shapiro_w  =  0.926303565502
skewness  =  -0.653818532884
slope_per10  =  -0.156386963639
slope_per90  =  0.343602552779
stetson_k  =  0.73059838012
weighted_mean  =  14.9777033368
weighted_std  =  0.303152617653
