-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.277410993137
cusum  =  0.136805089101
eta  =  0.497895236307
hl_amp_ratio  =  0.616683370281
kurtosis  =  -0.78194648243
n_points  =  262
period  =  0.717964350012
period_SNR  =  32.0940621953
period_log10FAP  =  -32.8985997463
period_uncertainty  =  0.000138796082542
phase_cusum  =  0.300437487656
phase_eta  =  0.286474192864
phi21  =  -2.01956066869
phi31  =  -3.92076974139
quartile31  =  0.36
r21  =  0.41333434599
r31  =  0.170506934553
shapiro_w  =  0.940295517445
skewness  =  -0.520353852388
slope_per10  =  -0.159838011232
slope_per90  =  0.399399995804
stetson_k  =  0.806143297899
weighted_mean  =  14.7158126161
weighted_std  =  0.237818462456
