-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.239980487544
cusum  =  0.167069084145
eta  =  0.560511071814
hl_amp_ratio  =  0.517855830096
kurtosis  =  -0.602021120961
n_points  =  352
period  =  0.654582615418
period_SNR  =  41.8303949819
period_log10FAP  =  -44.6281526312
period_uncertainty  =  0.000118799026518
phase_cusum  =  0.232364947653
phase_eta  =  0.108206825312
phi21  =  1.0484376234
phi31  =  2.43881989787
quartile31  =  0.295
r21  =  0.510915359721
r31  =  0.332570866888
shapiro_w  =  0.940455853939
skewness  =  -0.597792751942
slope_per10  =  -0.143361838538
slope_per90  =  0.289806961358
stetson_k  =  0.779802409539
weighted_mean  =  15.5551871559
weighted_std  =  0.200563715706
