-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.210532378104
cusum  =  0.136174231441
eta  =  1.13836405387
hl_amp_ratio  =  0.951234157507
kurtosis  =  -0.0664138994417
n_points  =  314
period  =  0.758094166456
period_SNR  =  31.0885525682
period_log10FAP  =  -22.8636385001
period_uncertainty  =  0.000159317039047
phase_cusum  =  0.239047659211
phase_eta  =  1.00770066037
phi21  =  -2.13485291615
phi31  =  -4.0251802434
quartile31  =  0.32
r21  =  0.416806401314
r31  =  0.317516168763
shapiro_w  =  0.99398547411
skewness  =  0.160609770783
slope_per10  =  -0.0789090926674
slope_per90  =  0.0866000005044
stetson_k  =  0.810398571223
weighted_mean  =  18.1937689947
weighted_std  =  0.213213117363
