-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.303919402427
cusum  =  0.10912952438
eta  =  0.547543664704
hl_amp_ratio  =  0.639971106673
kurtosis  =  -0.989169748041
n_points  =  395
period  =  0.613184353858
period_SNR  =  41.5971852849
period_log10FAP  =  -44.59733966
period_uncertainty  =  0.000121534958631
phase_cusum  =  0.24782294419
phase_eta  =  0.503944439199
phi21  =  1.16262255821
phi31  =  -0.0803590364021
quartile31  =  0.475
r21  =  0.464826898039
r31  =  0.124199498055
shapiro_w  =  0.953800678253
skewness  =  -0.323955556115
slope_per10  =  -0.0638550525491
slope_per90  =  0.128907259563
stetson_k  =  0.818572507019
weighted_mean  =  14.2171541758
weighted_std  =  0.293989524684
